PFD Error codes

Error Codes

Codes returned by the PFD program include

• No paper in tray • No people in room • No data in file

PFD Error Codes

ERROR CODES

Codes returned by the PFD[1] program include

o No paper in tray o No people in room o No data in file

1-9, Return for more, Help or Quit:

Window client

Terminal client

Sending hypertext data over the network in a high level (logical) representation allows optimum presentation according to the facilities of the reader’s platform.

Server

Original Data

<TITLE>PFD Error Codes</TITLE> <H1>Error Codes</H1> Codes returned by the <A HREF="pfd.html">PFD</A> program include <UL> <LI>No paper in tray <LI>No people in room <LI>No data in file </UL> ...